-- 问题建议表
CREATE TABLE `tbl_dzbc_feedback` (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT '编号',
  `user_id` bigint DEFAULT NULL COMMENT '用户ID',
  `user_name` varchar(100) DEFAULT NULL COMMENT '用户姓名',
  `user_phone` varchar(20) DEFAULT NULL COMMENT '用户电话',
  `content` text NOT NULL COMMENT '内容',
  `image_urls` text COMMENT '图片地址，多个用逗号分隔',
  `type` int NOT NULL COMMENT '类型 1-问题 2-建议',
  `status` int DEFAULT '0' COMMENT '状态 0-待处理 1-处理中 2-已完成',
  `reply_content` text COMMENT '回复内容',
  `reply_user_id` bigint DEFAULT NULL COMMENT '回复人ID',
  `reply_user_name` varchar(100) DEFAULT NULL COMMENT '回复人姓名',
  `reply_time` datetime DEFAULT NULL COMMENT '回复时间',
  `remark` varchar(500) DEFAULT NULL COMMENT '备注',
  `ext1` varchar(255) DEFAULT NULL COMMENT '扩展1',
  `ext2` varchar(255) DEFAULT NULL COMMENT '扩展2',
  `create_dept` bigint DEFAULT NULL,
  `create_by` bigint DEFAULT NULL,
  `create_time` datetime DEFAULT NULL,
  `update_by` bigint DEFAULT NULL,
  `update_time` datetime DEFAULT NULL,
  PRIMARY KEY (`id`),
  KEY `idx_user_id` (`user_id`),
  KEY `idx_type` (`type`),
  KEY `idx_status` (`status`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci COMMENT='问题建议表';
