ALTER TABLE "SYS_OSS_CONFIG" ADD ("ACCESS_POLICY" CHAR(1) DEFAULT '1' NOT NULL);

COMMENT ON COLUMN "SYS_OSS_CONFIG"."ACCESS_POLICY" IS '桶权限类型(0=private 1=public 2=custom)';
