-- 服务区初始数据
INSERT INTO `adm_service_area` (`area_code`, `area_name`, `short_name`, `service_star`, `city`, `highway`, `direction`, `address`, `attr_org`, `mgr_org`, `open_date`, `land_area`, `floor_area`, `longitude`, `latitude`) VALUES ('321283124S3001', '常泰高速服务区(北区)', '北区', 4, '泰州', 'S30如常高速', '常州方向', '江苏省泰州市泰兴市虹桥镇常泰高速常州方向', null, null, '2025-01-01', '72.5', '6000', '120.050937', '32.071956');
INSERT INTO `adm_service_area` (`area_code`, `area_name`, `short_name`, `service_star`, `city`, `highway`, `direction`, `address`, `attr_org`, `mgr_org`, `open_date`, `land_area`, `floor_area`, `longitude`, `latitude`) VALUES ('321283124S3002', '常泰高速服务区(南区)', '南区', 4, '泰州', 'S30如常高速', '泰兴方向', '江苏省泰州市泰兴市虹桥镇常泰高速泰州方向', null, null, '2025-01-01', '72.5', '6000', '120.052389', '32.070408');

-- 建筑初始数据
INSERT INTO `adm_area_building` (`bldg_code`, `bldg_name`, `address`, `up_bldg_floor`, `down_bldg_floor`, `bldg_height`, `floor_area`, `bldg_usage`, `area_code`) VALUES ('321283124S300101', '综合楼', '北区中部', 2, 1, 13.7, 4700, '一层提供商业、餐饮、卫生间、开水服务，二层为办公区、会议区', '321283124S3001');
INSERT INTO `adm_area_building` (`bldg_code`, `bldg_name`, `address`, `up_bldg_floor`, `down_bldg_floor`, `bldg_height`, `floor_area`, `bldg_usage`, `area_code`) VALUES ('321283124S300102', '配电泵房', '北区西北角', 1, 0, null, 300, '配电设施，水泵设施工作区', '321283124S3001');
INSERT INTO `adm_area_building` (`bldg_code`, `bldg_name`, `address`, `up_bldg_floor`, `down_bldg_floor`, `bldg_height`, `floor_area`, `bldg_usage`, `area_code`) VALUES ('321283124S300103', '维修间&货车之家', '北区东侧', 2, 0, null, 300, '提供车辆维修服务', '321283124S3001');
INSERT INTO `adm_area_building` (`bldg_code`, `bldg_name`, `address`, `up_bldg_floor`, `down_bldg_floor`, `bldg_height`, `floor_area`, `bldg_usage`, `area_code`) VALUES ('321283124S300104', '加油站', '北区西南角', 1, 0, null, 200, '提供加油服务', '321283124S3001');
INSERT INTO `adm_area_building` (`bldg_code`, `bldg_name`, `address`, `up_bldg_floor`, `down_bldg_floor`, `bldg_height`, `floor_area`, `bldg_usage`, `area_code`) VALUES ('321283124S300105', '警务站', '北区东北角', 1, 0, null, 50000, '警务办公场地', '321283124S3001');
INSERT INTO `adm_area_building` (`bldg_code`, `bldg_name`, `address`, `up_bldg_floor`, `down_bldg_floor`, `bldg_height`, `floor_area`, `bldg_usage`, `area_code`) VALUES ('321283124S300106', '停车场', '北区广场', 1, 0, null, 50000, '车位', '321283124S3001');

INSERT INTO `adm_area_building` (`bldg_code`, `bldg_name`, `address`, `up_bldg_floor`, `down_bldg_floor`, `bldg_height`, `floor_area`, `bldg_usage`, `area_code`) VALUES ('321283124S300201', '综合楼', '南区中部', 2, 1, 14.2, 4788.2, '一层提供商业、餐饮、卫生间、开水服务，二层为员工餐厅、展厅', '321283124S3002');
INSERT INTO `adm_area_building` (`bldg_code`, `bldg_name`, `address`, `up_bldg_floor`, `down_bldg_floor`, `bldg_height`, `floor_area`, `bldg_usage`, `area_code`) VALUES ('321283124S300202', '配电泵房', '南区东南角', 1, 0, null, 300, '配电设施，水泵设施工作区', '321283124S3002');
INSERT INTO `adm_area_building` (`bldg_code`, `bldg_name`, `address`, `up_bldg_floor`, `down_bldg_floor`, `bldg_height`, `floor_area`, `bldg_usage`, `area_code`) VALUES ('321283124S300203', '维修间&货车之家', '南区西侧', 2, 0, null, 300, '提供车辆维修服务', '321283124S3002');
INSERT INTO `adm_area_building` (`bldg_code`, `bldg_name`, `address`, `up_bldg_floor`, `down_bldg_floor`, `bldg_height`, `floor_area`, `bldg_usage`, `area_code`) VALUES ('321283124S300204', '加油站', '南区东北角', 1, 0, null, 200, '提供加油服务', '321283124S3002');
INSERT INTO `adm_area_building` (`bldg_code`, `bldg_name`, `address`, `up_bldg_floor`, `down_bldg_floor`, `bldg_height`, `floor_area`, `bldg_usage`, `area_code`) VALUES ('321283124S300205', '宿舍楼', '南区西南角', 2, 0, null, 920, '提供员工住宿服务', '321283124S3002');
INSERT INTO `adm_area_building` (`bldg_code`, `bldg_name`, `address`, `up_bldg_floor`, `down_bldg_floor`, `bldg_height`, `floor_area`, `bldg_usage`, `area_code`) VALUES ('321283124S300206', '停车场', '南区广场', 1, 0, null, 50000, '车位', '321283124S3002');


-- 建筑初始数据
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-101', '开水泡面间', 1, '101', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-102', '超市', 1, '102', 200, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-103', '中式糕点', 1, '103', 150, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-104', '特色产品市集', 1, '104', 200, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-105', '奶茶&咖啡', 1, '105', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-106', '中式套餐', 1, '106', 200, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-107', '特色小吃', 1, '107', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-108', '串串&卤味', 1, '108', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-109', '糖葫芦&水果', 1, '109', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-110', '美食广场', 1, '110', 300, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-111', '男卫', 1, '111', 200, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-112', '男盥洗室', 1, '112', 150, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-113', '女卫', 1, '113', 200, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-114', '女盥洗室', 1, '114', 150, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-115', '工具间1', 1, '115', 50, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-116', '工具间2', 1, '116', 50, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-117', '工具间3', 1, '117', 50, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-118', '工具间4', 1, '118', 50, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300101', 'B-119', '货车服务空间', 1, '119', 50, '使用中');

INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300106', '321283124S3001_CW-XK', '小客停车位', 1, 'CW-XK', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300106', '321283124S3001_CW-CD', '充电车位', 1, 'CW-CD', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300106', '321283124S3001_CW-WZA', '无障碍车位', 1, 'CW-WZA', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300106', '321283124S3001_CW-DKC', '大客车停车位', 1, 'CW-DKC', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300106', '321283124S3001_CW-HC', '货车车位', 1, 'CW-HC', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300106', '321283124S3001_CW-WXP', '危险品车位', 1, 'CW-WXP', 100, '使用中');

INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-101', '开水泡面间', 1, '101', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-102', '超市', 1, '102', 200, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-103', '中式糕点', 1, '103', 150, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-104', '特色产品市集', 1, '104', 200, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-105', '奶茶&咖啡', 1, '105', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-106', '中式套餐', 1, '106', 200, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-107', '特色小吃', 1, '107', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-108', '串串&卤味', 1, '108', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-109', '糖葫芦&水果', 1, '109', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-110', '美食广场', 1, '110', 300, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-111', '男卫', 1, '111', 200, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-112', '男盥洗室', 1, '112', 150, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-113', '女卫', 1, '113', 200, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-114', '女盥洗室', 1, '114', 150, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-115', '工具间1', 1, '115', 50, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-116', '工具间2', 1, '116', 50, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-117', '工具间3', 1, '117', 50, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-118', '工具间4', 1, '118', 50, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300201', 'N-119', '货车服务空间', 1, '119', 50, '使用中');

INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300206', '321283124S3002_CW-XK', '小客停车位', 1, 'CW-XK', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300206', '321283124S3002_CW-CD', '充电车位', 1, 'CW-XK', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300206', '321283124S3002_CW-WZA', '无障碍车位', 1, 'CW-XK', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300206', '321283124S3002_CW-DKC', '大客车停车位', 1, 'CW-XK', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300206', '321283124S3002_CW-HC', '货车车位', 1, 'CW-XK', 100, '使用中');
INSERT INTO adm_area_building_zoning (`bldg_code`, `zoning_code`, `zoning_name`, `floor`, `room_no`, `bldg_ld_area`, `usage_detail`) VALUES ('321283124S300206', '321283124S3002_CW-WXP','危险品车位', 1, 'CW-XK', 100, '使用中');

-- 能源设施初始数据
INSERT INTO `adm_ems_facs` (`facs_code`, `facs_name`, `facs_type`, `facs_subtype`, `enable`, `ref_area`) VALUES ('W201', '北区-供电网', 'W', 'W2', 1, '321283124S3001');
INSERT INTO `adm_ems_facs` (`facs_code`, `facs_name`, `facs_type`, `facs_subtype`, `enable`, `ref_area`) VALUES ('W202', '南区-供电网', 'W', 'W2', 1, '321283124S3002');
INSERT INTO `adm_ems_facs` (`facs_code`, `facs_name`, `facs_type`, `facs_subtype`, `enable`, `ref_area`) VALUES ('E501', '北区-光伏', 'E', 'E5', 1, '321283124S3001');
INSERT INTO `adm_ems_facs` (`facs_code`, `facs_name`, `facs_type`, `facs_subtype`, `enable`, `ref_area`) VALUES ('E502', '南区-光伏', 'E', 'E5', 1, '321283124S3002');
INSERT INTO `adm_ems_facs` (`facs_code`, `facs_name`, `facs_type`, `facs_subtype`, `enable`, `ref_area`) VALUES ('Z101', '北区-室内照明', 'Z', 'Z001', 1, '321283124S3001');
INSERT INTO `adm_ems_facs` (`facs_code`, `facs_name`, `facs_type`, `facs_subtype`, `enable`, `ref_area`) VALUES ('Z102', '北区-室外照明', 'Z', 'Z002', 1, '321283124S3001');
INSERT INTO `adm_ems_facs` (`facs_code`, `facs_name`, `facs_type`, `facs_subtype`, `enable`, `ref_area`) VALUES ('Z110', '北区-公共设施', 'Z', 'Z010', 1, '321283124S3001');
INSERT INTO `adm_ems_facs` (`facs_code`, `facs_name`, `facs_type`, `facs_subtype`, `enable`, `ref_area`) VALUES ('Z120', '北区-空调设施', 'Z', 'Z020', 1, '321283124S3001');
INSERT INTO `adm_ems_facs` (`facs_code`, `facs_name`, `facs_type`, `facs_subtype`, `enable`, `ref_area`) VALUES ('Z201', '南区-室内照明', 'Z', 'Z001', 1, '321283124S3002');
INSERT INTO `adm_ems_facs` (`facs_code`, `facs_name`, `facs_type`, `facs_subtype`, `enable`, `ref_area`) VALUES ('Z202', '南区-室外照明', 'Z', 'Z002', 1, '321283124S3002');
INSERT INTO `adm_ems_facs` (`facs_code`, `facs_name`, `facs_type`, `facs_subtype`, `enable`, `ref_area`) VALUES ('Z210', '南区-公共设施', 'Z', 'Z010', 1, '321283124S3002');
INSERT INTO `adm_ems_facs` (`facs_code`, `facs_name`, `facs_type`, `facs_subtype`, `enable`, `ref_area`) VALUES ('Z220', '南区-空调设施', 'Z', 'Z020', 1, '321283124S3002');


-- 设施属性DEMO数据
INSERT INTO `adm_ems_facs_attr` (`facs_code`, `attr_name`, `attr_desc`, `attr_value`, `attr_unit`) VALUES ('W201', 'input_load', '进线负荷', '293.55', 'kw/h');
INSERT INTO `adm_ems_facs_attr` (`facs_code`, `attr_name`, `attr_desc`, `attr_value`, `attr_unit`) VALUES ('E501', 'installed_capacity', '装机容量', '2000', 'MW');

-- 设施属性DEMO数据
INSERT INTO `adm_ems_facs_ability` (`facs_code`, `ability_name`, `ability_desc`, `ability_param`) VALUES ('Z020', '开启', '开启空调', '{\"enable\":1}');
INSERT INTO `adm_ems_facs_ability` (`facs_code`, `ability_name`, `ability_desc`, `ability_param`) VALUES ('Z020', '关闭', '关闭空调', '{\"enable\":0}');

-- 设施事件DEMO数据
INSERT INTO `adm_ems_facs_event` (`facs_code`, `event_name`, `event_type`, `event_desc`, `event_code`, `ext_event_code`) VALUES ('Z101', '电压告警', '2', '电压过低告警', 'LOW_V',  '10001001');


-- 能源设施能流关系DEMO数据
INSERT INTO `adm_ems_facs_flow_rel` (`code`, `export_facs_code`, `input_facs_code`, `ems_cls`, `state`, `action_type`) VALUES ('W201_Z101', 'W201', 'Z101', '45', 1, '4501');
INSERT INTO `adm_ems_facs_flow_rel` (`code`, `export_facs_code`, `input_facs_code`, `ems_cls`, `state`, `action_type`) VALUES ('E501_W201', 'E501', 'W201', '45', 1, '4502');
INSERT INTO `adm_ems_facs_flow_rel` (`code`, `export_facs_code`, `input_facs_code`, `ems_cls`, `state`, `action_type`) VALUES ('E501_Z101', 'E501', 'Z101', '45', 1, '4505');


-- 能源计量设备DEMO数据
INSERT INTO `adm_meter_device` (`device_code`, `area_code`, `meter_cls`, `obj_type`, `obj_sub_type`, `obj_code`, `col_cycle`, `col_mode`, `magnification`, `spec_desc`) VALUES ('J-D-B-102', '321283124S3001', 45, 1, 3, 'B-102', 4, 1, 1, '直采表');
INSERT INTO `adm_meter_device` (`device_code`, `area_code`, `meter_cls`, `obj_type`, `obj_sub_type`, `obj_code`, `col_cycle`, `col_mode`, `magnification`, `spec_desc`) VALUES ('J-D-B-103', '321283124S3001', 45, 1, 3, 'B-103', 4, 1, 1, '直采表');
INSERT INTO `adm_meter_device` (`device_code`, `area_code`, `meter_cls`, `obj_type`, `obj_sub_type`, `obj_code`, `col_cycle`, `col_mode`, `magnification`, `spec_desc`) VALUES ('J-D-B-104', '321283124S3001', 45, 1, 3, 'B-104', 4, 1, 1, '直采表');
INSERT INTO `adm_meter_device` (`device_code`, `area_code`, `meter_cls`, `obj_type`, `obj_sub_type`, `obj_code`, `col_cycle`, `col_mode`, `magnification`, `spec_desc`) VALUES ('J-D-B-105', '321283124S3001', 45, 1, 3, 'B-105', 4, 1, 1, '直采表');
INSERT INTO `adm_meter_device` (`device_code`, `area_code`, `meter_cls`, `obj_type`, `obj_sub_type`, `obj_code`, `col_cycle`, `col_mode`, `magnification`, `spec_desc`) VALUES ('J-D-B-106', '321283124S3001', 45, 1, 3, 'B-106', 4, 1, 1, '直采表');
INSERT INTO `adm_meter_device` (`device_code`, `area_code`, `meter_cls`, `obj_type`, `obj_sub_type`, `obj_code`, `col_cycle`, `col_mode`, `magnification`, `spec_desc`) VALUES ('J-D-B-107', '321283124S3001', 45, 1, 3, 'B-107', 4, 1, 1, '直采表');
INSERT INTO `adm_meter_device` (`device_code`, `area_code`, `meter_cls`, `obj_type`, `obj_sub_type`, `obj_code`, `col_cycle`, `col_mode`, `magnification`, `spec_desc`) VALUES ('J-D-B-108', '321283124S3001', 45, 1, 3, 'B-108', 4, 1, 1, '直采表');
INSERT INTO `adm_meter_device` (`device_code`, `area_code`, `meter_cls`, `obj_type`, `obj_sub_type`, `obj_code`, `col_cycle`, `col_mode`, `magnification`, `spec_desc`) VALUES ('J-D-B-109', '321283124S3001', 45, 1, 3, 'B-109', 4, 1, 1, '直采表');
INSERT INTO `adm_meter_device` (`device_code`, `area_code`, `meter_cls`, `obj_type`, `obj_sub_type`, `obj_code`, `col_cycle`, `col_mode`, `magnification`, `spec_desc`) VALUES ('J-D-B-110', '321283124S3001', 45, 1, 3, 'B-110', 4, 1, 1, '直采表');
INSERT INTO `adm_meter_device` (`device_code`, `area_code`, `meter_cls`, `obj_type`, `obj_sub_type`, `obj_code`, `col_cycle`, `col_mode`, `magnification`, `spec_desc`) VALUES ('J-D-Z010-R103-001', '321283124S3001', 45, 2, 2, 'Z010-R103-001', 4, 1, 20, '互感器表');

-- 配电柜DEMO数据
INSERT INTO adm_power_box (`box_code`, `box_type`, `area_code`, `location`, `box_size`, `gateway_addr`, `gateway_port`) VALUES ('D-B-1001', 1, '321283124S3001', '综合楼配电间', '100*200', '0.0.0.0', 9999);
INSERT INTO adm_power_box (`box_code`, `box_type`, `area_code`, `location`, `box_size`, `gateway_addr`, `gateway_port`) VALUES ('D-B-1002', 1, '321283124S3001', '广场配电柜', '100*200', '0.0.0.0', 9999);
INSERT INTO adm_power_box (`box_code`, `box_type`, `area_code`, `location`, `box_size`, `gateway_addr`, `gateway_port`) VALUES ('D-N-1001', 1, '321283124S3002', '综合楼配电间', '100*200', '0.0.0.0', 9999);
INSERT INTO adm_power_box (`box_code`, `box_type`, `area_code`, `location`, `box_size`, `gateway_addr`, `gateway_port`) VALUES ('D-N-1002', 1, '321283124S3002', '广场配电柜', '100*200', '0.0.0.0', 9999);

-- 动力箱柜电气设备表
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-B-1001', 'D-B-1001-10000', '0x0001', 'RCD', '总开（漏保）', 380, 200, null, null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-B-1001', 'D-B-1001-10011', '0x0002', 'QF', '分开（空开）', 380, 60, 'D-B-1001-10000', null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-B-1001', 'D-B-1001-11012', '0x0003', 'QF', '分开（空开）', 380, 60, 'D-B-1001-10000', null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-B-1001', 'D-B-1001-11013', '0x0003', 'QF', '分开（空开）', 380, 60, 'D-B-1001-10000', null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-B-1001', 'D-B-1001-11014', '0x0004', 'QF', '分开（空开）', 380, 60, 'D-B-1001-10000', null);

INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-B-1002', 'D-B-1002-10000', '0x0011', 'RCD', '总开（漏保）', 380, 200, null, null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-B-1002', 'D-B-1002-10011', '0x0012', 'QF', '分开（空开）', 380, 60, 'D-B-1002-10000', null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-B-1002', 'D-B-1002-11012', '0x0013', 'QF', '分开（空开）', 380, 60, 'D-B-1002-10000', null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-B-1002', 'D-B-1002-11013', '0x0013', 'QF', '分开（空开）', 380, 60, 'D-B-1002-10000', null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-B-1002', 'D-B-1002-11014', '0x0014', 'QF', '分开（空开）', 380, 60, 'D-B-1002-10000', null);

INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-N-1001', 'D-N-1001-10000', '0x0101', 'RCD', '总开（漏保）', 380, 200, null, null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-N-1001', 'D-N-1001-10011', '0x0102', 'QF', '分开（空开）', 380, 60, 'D-N-1001-10000', null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-N-1001', 'D-N-1001-11012', '0x0103', 'QF', '分开（空开）', 380, 60, 'D-N-1001-10000', null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-N-1001', 'D-N-1001-11013', '0x0103', 'QF', '分开（空开）', 380, 60, 'D-N-1001-10000', null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-N-1001', 'D-N-1001-11014', '0x0104', 'QF', '分开（空开）', 380, 60, 'D-N-1001-10000', null);

INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-N-1002', 'D-B-1002-10000', '0x0201', 'RCD', '总开（漏保）', 380, 200, null, null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-N-1002', 'D-B-1002-10011', '0x0202', 'QF', '分开（空开）', 380, 60, 'D-B-1002-10000', null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-N-1002', 'D-B-1002-11012', '0x0203', 'QF', '分开（空开）', 380, 60, 'D-B-1002-10000', null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-N-1002', 'D-B-1002-11013', '0x0203', 'QF', '分开（空开）', 380, 60, 'D-B-1002-10000', null);
INSERT INTO adm_box_elec_eqpt (`box_code`, `eqpt_code`, `ext_eqpt_code`, `eqpt_type`, `eqpt_spec`, `rated_voltage`, `rated_current`, `parent_eqpt`, `meter_device`) VALUES ('D-N-1002', 'D-B-1002-11014', '0x0204', 'QF', '分开（空开）', 380, 60, 'D-B-1002-10000', null);

-- 区域&标签关系表
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-101','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-102','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-103','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-104','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-105','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-106','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-107','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-108','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-109','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-110','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-111','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-112','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-113','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-114','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-115','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-116','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-117','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-118','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','B-119','Area_00');

insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','321283124S3001_CW-CD','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','321283124S3001_CW-DKC','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','321283124S3001_CW-HC','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','321283124S3001_CW-WXP','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','321283124S3001_CW-WZA','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','321283124S3001_CW-XK','Area_00');

insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-101','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-102','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-103','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-104','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-105','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-106','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-107','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-108','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-109','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-110','Area_01');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-111','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-112','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-113','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-114','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-115','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-116','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-117','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-118','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','N-119','Area_00');

insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','321283124S3002_CW-CD','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','321283124S3002_CW-DKC','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','321283124S3002_CW-HC','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','321283124S3002_CW-WXP','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','321283124S3002_CW-WZA','Area_00');
insert into adm_obj_tag_rel(`tag_type`,`obj_code`,`tag_code`) VALUES ('3','321283124S3002_CW-XK','Area_00');

-- 服务区用电属性数据
INSERT INTO adm_area_elec_attr (`area_code`, `price_code`, `req_capacity_flag`, `trans_capacity`, `req_quantity`) VALUES ('321283124S3001', '4001', 1, 630, NULL);
INSERT INTO adm_area_elec_attr (`area_code`, `price_code`, `req_capacity_flag`, `trans_capacity`, `req_quantity`) VALUES ('321283124S3002', '4001', 1, 630, NULL);

-- 国网电价数据
-- 单一制初始电价数据
INSERT INTO adm_gw_elecprice_config (`cfg_code`, `elec_type`, `voltage_level`, `degree_price`, `fs_peak_degree_price`, `fs_high_degree_price`, `fs_flat_degree_price`, `fs_low_degree_price`, `max_req_price`, `trans_capacity_price`) VALUES ('3001', 3, '不满1千伏', 0.7624, 1.5296, 1.2747, 0.7624, 0.3445, NULL, NULL);
INSERT INTO adm_gw_elecprice_config (`cfg_code`, `elec_type`, `voltage_level`, `degree_price`, `fs_peak_degree_price`, `fs_high_degree_price`, `fs_flat_degree_price`, `fs_low_degree_price`, `max_req_price`, `trans_capacity_price`) VALUES ('3002', 3, '1-10(20)千伏', 0.7364, 1.4774, 1.2312, 0.7364, 0.3327, NULL, NULL);
INSERT INTO adm_gw_elecprice_config (`cfg_code`, `elec_type`, `voltage_level`, `degree_price`, `fs_peak_degree_price`, `fs_high_degree_price`, `fs_flat_degree_price`, `fs_low_degree_price`, `max_req_price`, `trans_capacity_price`) VALUES ('3003', 3, '35千伏', 0.7114, 1.4273, 1.1894, 0.7114, 0.3214, NULL, NULL);

-- 两部制初始电价数据
INSERT INTO adm_gw_elecprice_config (`cfg_code`, `elec_type`, `voltage_level`, `degree_price`, `fs_peak_degree_price`, `fs_high_degree_price`, `fs_flat_degree_price`, `fs_low_degree_price`, `max_req_price`, `trans_capacity_price`) VALUES ('4001', 4, '1-10(20)千伏', 0.6587, 1.3592, 1.1327, 0.6587, 0.2757, 51.2, 32);
INSERT INTO adm_gw_elecprice_config (`cfg_code`, `elec_type`, `voltage_level`, `degree_price`, `fs_peak_degree_price`, `fs_high_degree_price`, `fs_flat_degree_price`, `fs_low_degree_price`, `max_req_price`, `trans_capacity_price`) VALUES ('4002', 4, '35千伏', 0.6337, 1.3076, 1.0897, 0.6337, 0.2652, 48, 30);
INSERT INTO adm_gw_elecprice_config (`cfg_code`, `elec_type`, `voltage_level`, `degree_price`, `fs_peak_degree_price`, `fs_high_degree_price`, `fs_flat_degree_price`, `fs_low_degree_price`, `max_req_price`, `trans_capacity_price`) VALUES ('4003', 4, '110千伏', 0.6087, 1.256, 1.0467, 0.6087, 0.2547, 44.8, 28);
INSERT INTO adm_gw_elecprice_config (`cfg_code`, `elec_type`, `voltage_level`, `degree_price`, `fs_peak_degree_price`, `fs_high_degree_price`, `fs_flat_degree_price`, `fs_low_degree_price`, `max_req_price`, `trans_capacity_price`) VALUES ('4004', 4, '220千伏及以上', 0.5827, 1.2024, 1.002, 0.5827, 0.2439, 41.6, 26);


-- 峰谷电价策略数据
-- 默认策略
INSERT INTO adm_elecprice_strategy (`strategy_code`, `strategy_name`, `strategy_desc`, `repeat_type`, `repeat_param`, `priority`, `edit_flag`) VALUES ('-1', '默认策略', '0:00-24:00 执行平峰电价', 2, null, 0, 0);
INSERT INTO adm_elecprice_strategy_hour (`strategy_code`, `start_time`, `end_time`, `type`) VALUES ('-1', '00:00:00', '23:59:59', 0);

-- 默认策略
INSERT INTO adm_elecprice_strategy (`strategy_code`, `strategy_name`, `strategy_desc`, `repeat_type`, `repeat_param`, `priority`, `edit_flag`) VALUES ('1001', '100千伏安', '100千伏安以上峰谷电价', 2, null, 1, 1);
INSERT INTO adm_elecprice_strategy_hour (`strategy_code`, `start_time`, `end_time`, `type`) VALUES ('1001', '00:00:00', '08:00:00', -1);
INSERT INTO adm_elecprice_strategy_hour (`strategy_code`, `start_time`, `end_time`, `type`) VALUES ('1001', '08:00:00', '10:00:00', 1);
INSERT INTO adm_elecprice_strategy_hour (`strategy_code`, `start_time`, `end_time`, `type`) VALUES ('1001', '11:00:00', '17:00:00', 0);
INSERT INTO adm_elecprice_strategy_hour (`strategy_code`, `start_time`, `end_time`, `type`) VALUES ('1001', '17:00:00', '22:00:00', 1);
INSERT INTO adm_elecprice_strategy_hour (`strategy_code`, `start_time`, `end_time`, `type`) VALUES ('1001', '22:00:00', '23:59:59', 0);

-- 商户能源计费策略
INSERT INTO adm_co_charging_config (`area_code`, `elec_unit_price`, `elec_gt_compute_type`, `elec_compute_desc`, `water_unit_price`, `water_gt_compute_type`, `water_compute_desc`) VALUES ('321283124S3001', 0.6068, 1, '1.按户数均摊\n公摊电费每户收费 = 公摊电费 / 户数\n2、按面积分摊\n单户公摊电费 = 公摊电费 * (单户面积 / 总面积)', 3.04, 0, NULL);
INSERT INTO adm_co_charging_config (`area_code`, `elec_unit_price`, `elec_gt_compute_type`, `elec_compute_desc`, `water_unit_price`, `water_gt_compute_type`, `water_compute_desc`) VALUES ('321283124S3002', 0.6068, 1, '1.按户数均摊\n公摊电费每户收费 = 公摊电费 / 户数\n2、按面积分摊\n单户公摊电费 = 公摊电费 * (单户面积 / 总面积)', 3.04, 0, NULL);

