truncate table GK_BASIC_JSJY_JYR_SSSB;
--设施设备
prompt Importing table GK_BASIC_JSJY_JYR_SSSB...
set feedback off
set define off
insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('105B1A0D3E71431FB2CCD5C68ED7ECD4', '消防器材', '9D79AE146B3340D691AD5ED32F07C6A2', '邳州港子公司', null, '90020', 'FA1D8A1F827446FB9857E3AE4D47CED3', null, null, null, '具', 218, '31-12月-16 10.44.00.000000 上午', '各生产大型设备操作室，流动机械驾驶室，各类备存备件存放点，变电所，办公楼等。', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000053', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('6CF894F5F6C94FCD9C873708466844A4', '绝缘靴', '9D79AE146B3340D691AD5ED32F07C6A2', '邳州港子公司', null, '90020', 'FA1D8A1F827446FB9857E3AE4D47CED3', null, null, null, '双', 2, '30-12月-15 10.50.40.000000 上午', '供电站变电室、7#电磁站', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000054', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('DA319A652BEB412BA770862272B4043A', '绝缘手套', '9D79AE146B3340D691AD5ED32F07C6A2', '邳州港子公司', null, '90020', 'FA1D8A1F827446FB9857E3AE4D47CED3', null, null, null, '双', 2, '31-12月-15 10.58.19.000000 上午', '供电站变电室、7#电磁站', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000055', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('7D02A653D6FD4756B87EA5676700F849', '护栏', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', '4501', null, null, '组', 8, '18-11月-24 09.41.53.000000 上午', '2#机、3#机、4#机、5#机、6#机、东大机、西大机、通用码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000035', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('D9175AB638E9417B8A1F717E68AF1679', '隔离墩', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', '4501', null, null, '块', 100, '18-11月-24 09.49.38.000000 上午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000036', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('4E99EE6C192C4877AF9C0C4D4BAAD4A4', '广角镜', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', '4501', null, null, '个', 4, '18-11月-24 09.50.56.000000 上午', '货场', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000037', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('26BAEBCAC4A34B059A2C1A6FFDA30B56', '减速带', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', '4501', null, null, '个', 1, '18-11月-24 09.52.58.000000 上午', '生产区门口', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000038', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('FC98F326336644F6A99C8C3B6BEBE235', '令克棒', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', null, null, null, '根', 1, '09-12月-14 09.56.33.000000 上午', '变电所', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000039', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('0A51F9D1DCFC4AEF8494D5C78B85FA99', '绝缘胶靴、手套', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', null, null, null, '付', 4, '25-9月 -15 09.59.08.000000 上午', '变电所', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000040', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('86C3DC7723F8470E8DCB24F8D6C118A4', '洒水车', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', null, null, null, '辆', 1, '11-11月-24 10.00.46.000000 上午', '环保班', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000041', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('D9F02ED23A224F4ABB337F065D37363B', '高压喷淋', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', null, null, null, '个', 32, '18-11月-24 10.03.18.000000 上午', '货场', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000042', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('FD37E07F5EE747959B04120688F6E113', '防雷装置', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', null, null, null, '处', 36, '18-9月 -24 10.05.26.000000 上午', '变电所、浴室、招待所、油库、办公楼、调度楼、皮带秤、灯塔、汽车衡等', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000043', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('A75B6018C79A464DB8D3C1FFE5B3FE29', '棉安全帽', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', '4504', null, null, '只', 71, '18-5月 -16 10.50.39.000000 上午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000044', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('9B0E02BC2D1241CD80F893F97F19333D', '沉淀池', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', null, null, null, '座', 6, '18-11月-24 10.52.36.000000 上午', '2#机、3#机、4#机、5#机、6#机、通用码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000045', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('1513DAB7A0034D2D8D1E8E671001A3EA', '汽车用导航', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', null, null, null, '个', 1, '14-6月 -24 10.57.25.000000 上午', '金龙大客车', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000046', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('E5AA04A202854C169AB742A3B25E8335', '逃生锤', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', null, null, null, '把', 12, '14-6月 -24 10.59.55.000000 上午', '亚星大客车、金龙大客车', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000047', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('1491A8D466844DA284DCBC60286A3895', '绝缘棒', '9D79AE146B3340D691AD5ED32F07C6A2', '邳州港子公司', null, '90020', 'FA1D8A1F827446FB9857E3AE4D47CED3', null, null, null, '根', 1, '31-12月-15 10.59.26.000000 上午', '7#电磁站', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000056', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('07C263771CA648128C9CFCAC42C6BF14', '消防器材', '4B9FB0CDC3024182951F477952F0763D', '万寨港分公司', '87766129', '90020', '2AA3DD70EC014D37A40F31BD55574B4A', null, null, '1kg干粉灭火器', '个', 7, '30-11月-15 09.33.25.000000 上午', '办公室小车班', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000057', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('FA6FD68E648F4CDB8CF42642DDDA9FCD', '消防器材', '4B9FB0CDC3024182951F477952F0763D', '万寨港分公司', '87766129', '90020', '2AA3DD70EC014D37A40F31BD55574B4A', null, null, '2kg干粉灭火器', '个', 34, '30-11月-15 09.37.08.000000 上午', '车间、配电室、挡案室、磅房', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000058', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('526C36A507C548FE9E1D98A82B398AD3', '消防器材', '4B9FB0CDC3024182951F477952F0763D', '万寨港分公司', '87766129', '90020', '2AA3DD70EC014D37A40F31BD55574B4A', null, null, '4kg干粉灭火器', '个', 86, '30-11月-15 09.39.34.000000 上午', '变电所、食堂、办公楼、招待所', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000059', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('3BD6C8105C8C43DA9A92257497B466FE', '消防器材', '4B9FB0CDC3024182951F477952F0763D', '万寨港分公司', '87766129', '90020', '2AA3DD70EC014D37A40F31BD55574B4A', null, null, '5kg干粉灭火器', '个', 118, '30-11月-15 09.41.04.000000 上午', '作业区、车间、设备技术部', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000060', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('FEEF8D463EAA4284BA1B3CB0D797EB89', '消防器材', '4B9FB0CDC3024182951F477952F0763D', '万寨港分公司', '87766129', '90020', '2AA3DD70EC014D37A40F31BD55574B4A', null, null, '35kg干粉灭火器', '个', 8, '30-11月-15 09.42.25.000000 上午', '油库、仓库', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000061', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('ED6CB6E382454C50841EB22A07B8188E', '消防器材', '4B9FB0CDC3024182951F477952F0763D', '万寨港分公司', '87766129', '90020', '2AA3DD70EC014D37A40F31BD55574B4A', null, null, 'C02——2灭火器', '个', 28, '30-11月-15 09.43.36.000000 上午', '侯工室', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000062', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('B9B9BA6070E147D2A72E1C452B5507F3', '安全警示标志', '9D79AE146B3340D691AD5ED32F07C6A2', '邳州港子公司', null, '90020', 'FA1D8A1F827446FB9857E3AE4D47CED3', null, null, null, '个', 306, '31-12月-34 10.34.47.000000 上午', '公司所属生产设备、作业及办公等区域和港区道路存在危险因素的场所', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000052', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('3D2C39522E484C4A8939AE743955B969', '报警器', 'A5CE12A974F040AEAB0344597507264C', '徐州油库阚山码头', '051687711029', '90020', 'E47B148649D2421896364741C024CCA6', '4505', null, 'Ｊ-ＳＡＭ-ＧＳＴ9116', '个', 3, '10-11月-56 10.35.28.000000 上午', '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000003', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('B2A307208D134B99B49F7EEB2231AA78', '静电接地报警仪', 'A5CE12A974F040AEAB0344597507264C', '徐州油库阚山码头', null, '90020', 'E47B148649D2421896364741C024CCA6', '4501', null, null, '台', 2, '06-11月-52 10.39.19.000000 上午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000004', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('D65FE2B29AA145198EF12122C12CDC5F', '围油缆', 'A5CE12A974F040AEAB0344597507264C', '徐州油库阚山码头', null, '90020', 'E47B148649D2421896364741C024CCA6', '4505', null, null, '米', 200, '10-11月-57 10.47.00.000000 上午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000005', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('FC1B0A271F174105A51D759341BA4F75', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ8干粉灭火器', '只', 3, '14-11月-15 03.33.26.000000 下午', '1号配电室', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000048', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('50E1B124712E4B0BA8DD6331A0887FFD', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ8型干粉灭火器', '只', 1, '14-11月-15 03.40.32.000000 下午', '3号配电室', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000049', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('C2E052E4EE94405CB80A8AF6171B3D0D', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ5型干粉灭火器', '只', 3, '20-11月-15 03.43.44.000000 下午', '小修班', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000050', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('84C2757E1EC14B5E94C55AF4AF8ECFC4', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ/ABC2型干粉灭火器', '只', 2, '20-11月-15 03.45.54.000000 下午', '东磅房', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000051', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('7128DABC3CD1495F92C60B8502F8DEFC', '干粉灭火器', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', '051687238847', '90020', 'E47B148649D2421896364741C024CCA6', '4502', null, null, '只', 100, '17-11月-16 03.26.38.000000 下午', '港区', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000026', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('E15A1BB394A64AE1A01E5C3E6294D79B', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ8型干粉灭火器', '台', 15, '20-11月-15 10.15.50.000000 上午', 'G1、G2、G3、G4、G5、MI、M2吊机', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000067', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('9F03AC61840442A3AB820618F9C94893', '安全标志', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', '4503', null, null, '块', 168, '18-11月-30 08.52.53.000000 上午', '港区', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000027', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('F855AE22AFC848D7B9F7FFBFB728E023', '救生衣', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', '4504', null, '大号', '件', 10, '10-4月 -17 09.10.18.000000 上午', '调度室、化验室、小工队', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000028', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('8209F47061484CB1AD6DBD38036D405F', '安全带', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', '4504', null, 'WY-DZD', '条', 6, '18-11月-24 09.13.39.000000 上午', '电工班、吊机班', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000029', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('DF6423D131D4434FABE87C654081FA3C', '电焊防护面罩', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', '4504', null, null, '个', 4, '11-11月-19 09.15.33.000000 上午', '钳工班、车间', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000030', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('5DE4250DB6104F759E4D01AE513B4985', '护目镜', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', '4504', null, null, '个', 4, '19-11月-19 09.25.03.000000 上午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000031', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('29BB9D9C97FF481E876A39421EC19798', '安全帽', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', '4504', null, null, '只', 20, '23-5月 -16 09.28.05.000000 上午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000032', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('E07AC29C44F34FC0B91B4B94E29ABCD2', '安全帽', '517A37CD1D314C30B2F109A7EFFD1E15', '双楼港分公司', null, '90020', 'E47B148649D2421896364741C024CCA6', '4504', null, null, '只', 85, '18-9月 -16 09.38.10.000000 上午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000033', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('C2359B0F3442411EB7EDB5FEC9B6592F', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ8型干粉灭火器', '台', 2, '20-11月-15 10.18.37.000000 上午', '办公楼1楼', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000068', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('A679F34FABAD4FED80E289174964F77B', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ8型干粉灭火器', '台', 2, '20-11月-15 10.20.32.000000 上午', '办公楼2楼', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000069', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('6278C13C9B5D41D7B4D658144D291349', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ8型干粉灭火器', '台', 2, '20-11月-15 10.21.39.000000 上午', '办公楼3楼', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000070', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('78268D88EBA94CB1940FC6A5796EC96D', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ8型干粉灭火器', '台', 2, '20-11月-15 10.22.42.000000 上午', '办公楼4楼', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000071', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('53FE05314CDA439D8C709598CD29A982', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, '1211', '台', 1, '20-11月-15 10.23.40.000000 上午', '微机室', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000072', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('EE9529997AA24FBCA7AA9390EC0C41F2', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MT/2型二氧化碳', '台', 2, '20-11月-15 10.24.24.000000 上午', '档案室', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000073', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('B39A8CACB35949BFB3872AD426ADBA27', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ5型干粉灭火器', '台', 4, '20-11月-15 10.25.28.000000 上午', '职工活动中心', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000074', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('FE710A642D7E4881B88CB852027016E7', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ8型干粉灭火器', '台', 1, '20-11月-15 10.29.48.000000 上午', '沥青装卸架', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000075', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('77B6A49F0B24462CA7D157A6E90CB419', '安全标志牌', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4503', null, null, '处', 8, '28-10月-15 10.32.33.000000 上午', '港口作业区域', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000076', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('6CE53654B518464390E35EC3D678FE90', '安全标志牌', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4503', null, null, '处', 9, '28-10月-15 10.39.10.000000 上午', '港口作业区域', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000077', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('1058F9EA81FC4E85B1A44AE3ABED7D2A', '安全标志牌', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4503', null, null, '处', 20, '28-10月-15 10.41.03.000000 上午', '港口作业区域', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000078', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('52AD753C197F4914B95F486D61D472BE', '消防炮', 'A5CE12A974F040AEAB0344597507264C', '徐州油库阚山码头', '051687711029', '90020', 'E47B148649D2421896364741C024CCA6', '4505', null, 'ＦＱＳ80', '台', 3, '10-10月-46 09.53.08.000000 上午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000001', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('7CDCDD2CA71E4F819D8CA14AC10E2C85', '消防栓', 'A5CE12A974F040AEAB0344597507264C', '徐州油库阚山码头', '051687711029', '90020', 'E47B148649D2421896364741C024CCA6', '4501', null, 'ＤＮ100', '个', 6, '10-11月-50 10.15.10.000000 上午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000002', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('D5FDC1FD8BB5474AA3E3204852D943F1', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ/ABC2型干粉灭火器', '台', 1, '20-11月-15 10.08.13.000000 上午', '计划财务部', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000063', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('D0715918B8E84CD191B392DE5770DEFD', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ8型干粉灭火器', '台', 3, '20-11月-15 10.11.06.000000 上午', '食堂', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000064', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('6E33A19D76FF4B6E8634BBE85429C9F4', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ8型干粉灭火器', '台', 4, '20-11月-16 10.12.52.000000 上午', '流动机械班', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000065', 'Y', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('8BF3E5AD4E6E44DF883A3E6D45720057', '消防器材', '031AAB1BFBDC42879305C032D936BE3C', '孟家沟港分公司', null, '90020', '2AA3DD70EC014D37A40F31BD55574B4A', '4502', null, 'MFZ8型干粉灭火器', '台', 2, '20-11月-15 10.14.31.000000 上午', '仓库', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '659D99470458492C89F45D6C757AFEAD', '9000000066', 'Y', 'N', null, null, null, null);

prompt Done.
commit;