delete from GK_BASIC_JSJY_JYR_SSSB;
--设施设备
insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('1D79DB0483F84FFF9F4F561DD4E16421', '泡沫剂', 'EA3E05C69CAD493BAE19F9B90729A1B2', '华扬油气试采工程公司', null, '90027', 'C5053708E1074B35BC09B559A7EE3FB0', null, null, null, '桶', 10, '31-10月-17 02.56.44.000000 下午', '草舍、台南码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000004', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('2188A707A6104F5BBDE07AC8F91A97AB', '泡沫消火栓', 'EA3E05C69CAD493BAE19F9B90729A1B2', '华扬油气试采工程公司', null, '90027', 'C5053708E1074B35BC09B559A7EE3FB0', null, null, null, '个', 4, '31-8月 -16 02.58.19.000000 下午', '草舍、台南码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000005', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('C33BB67EC756421C98623FFDA36A2AD9', '便携式多功能可燃气体报警器', '26993F9861B04B78BC6678F2A88CFE3E', '安和焦化', null, '90027', 'C5053708E1074B35BC09B559A7EE3FB0', null, null, null, '台', 2, '08-10月-15 03.56.32.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000025', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('A9125C0FC1414E4EBD6E37CAD6E89895', '手提式干粉灭火器', '26993F9861B04B78BC6678F2A88CFE3E', '安和焦化', null, '90027', 'C5053708E1074B35BC09B559A7EE3FB0', null, null, null, '具', 16, '29-9月 -15 02.59.27.000000 下午', '港口码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000024', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('08E9D6E16076482290B05F2AD05158D1', '视频监控系统', '26993F9861B04B78BC6678F2A88CFE3E', '安和焦化', null, '90027', 'C5053708E1074B35BC09B559A7EE3FB0', null, null, null, '套', 1, '17-1月 -16 09.37.54.000000 上午', '码头区域', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000026', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('F5F1DA1D73134C92BB8220FEB37FE4BE', '避雷系统', '26993F9861B04B78BC6678F2A88CFE3E', '安和焦化', null, '90027', 'C5053708E1074B35BC09B559A7EE3FB0', null, null, null, '套', 1, '24-10月-15 12.00.00.000000 上午', '码头区域', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000027', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('1F484F064A4F4FA78B251934E9238D96', '便携式可燃气体检测仪', 'EA3E05C69CAD493BAE19F9B90729A1B2', '华扬油气试采工程公司', null, '90027', 'C5053708E1074B35BC09B559A7EE3FB0', null, null, 'MC2-OWOO-Y-CN', '个', 2, '09-9月 -15 12.00.20.000000 上午', '草舍、台南码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000001', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('294FA82322EA4B8D919ED7C632FA9730', '静电释放装置', 'EA3E05C69CAD493BAE19F9B90729A1B2', '华扬油气试采工程公司', null, '90027', 'C5053708E1074B35BC09B559A7EE3FB0', null, null, null, '个', 4, '30-9月 -16 02.52.21.000000 下午', '草舍、台南码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000002', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('C995B882BA9A48B480B3256551E6794B', '灭火器', 'EA3E05C69CAD493BAE19F9B90729A1B2', '华扬油气试采工程公司', null, '90027', 'C5053708E1074B35BC09B559A7EE3FB0', null, null, null, '个', 14, '19-7月 -16 02.55.17.000000 下午', '草舍、台南码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000003', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('DE008E3888BD4724A74ABA7DA2A0677C', '码头区域安全防护设施', 'DC56003B63624EACB583C26A3EDD586E', '盐海化工有限公司', null, '90027', '689EFE7E08284F39896876624262EE0F', null, null, null, '个', 28, '21-6月 -17 02.47.41.000000 下午', '操作间', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000061', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('97A3DEE6F429487B87E763CEB041194E', '码头区域消防设施', 'DC56003B63624EACB583C26A3EDD586E', '盐海化工有限公司', null, '90027', '689EFE7E08284F39896876624262EE0F', null, null, null, '个', 24, '01-1月 -16 02.50.02.000000 下午', '码头现场', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000062', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('1EBEFF7522DD4115B6B770B23E59D9B7', '码头区域警示标志', 'DC56003B63624EACB583C26A3EDD586E', '盐海化工有限公司', null, '90027', '689EFE7E08284F39896876624262EE0F', null, null, null, '个', 28, '01-1月 -18 02.50.57.000000 下午', '码头现场', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000063', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('1747E7ECEC1746C687BC484FFBB31B64', '可燃气体检测仪', '1C7C481A4ABA48BC80F265E79CB670F1', '中石化新兴油库', null, '90027', '5A7C2E23248249BE955A68A3734563BF', null, null, null, '台', 2, '01-1月 -17 03.30.25.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000032', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('FD4619B49CEF4482BEF6A886514DF70E', '消防泡沫炮', '1C7C481A4ABA48BC80F265E79CB670F1', '中石化新兴油库', null, '90027', '5A7C2E23248249BE955A68A3734563BF', null, null, null, '台', 1, '01-1月 -17 03.33.24.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000033', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('1B02AB174F0B44BEBD1CAE06C3B4658D', '6%氟蛋白泡沫液', '1C7C481A4ABA48BC80F265E79CB670F1', '中石化新兴油库', null, '90027', '5A7C2E23248249BE955A68A3734563BF', null, null, null, '桶', 2, '01-1月 -16 03.35.24.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000034', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('550795A646AD46EEBCE124D4183D3B4A', '35KG干粉灭火机', '1C7C481A4ABA48BC80F265E79CB670F1', '中石化新兴油库', null, '90027', '5A7C2E23248249BE955A68A3734563BF', null, null, null, '台', 2, '01-1月 -16 03.36.25.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000035', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('61E2E04CC86A4A4FBE3373857D6BC8D0', '4KG干粉灭火机', '1C7C481A4ABA48BC80F265E79CB670F1', '中石化新兴油库', null, '90027', '5A7C2E23248249BE955A68A3734563BF', null, null, null, '台', 4, '01-1月 -16 03.37.46.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000036', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('5C87455E7BC34002A39B931896EA02B2', '3KG二氧化碳灭火机', '1C7C481A4ABA48BC80F265E79CB670F1', '中石化新兴油库', null, '90027', '5A7C2E23248249BE955A68A3734563BF', null, null, null, '台', 4, '01-1月 -16 03.38.46.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000037', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('D63835B121FE4F60BEE255A646F829DC', '围油栏', '1C7C481A4ABA48BC80F265E79CB670F1', '中石化新兴油库', null, '90027', '5A7C2E23248249BE955A68A3734563BF', null, null, null, '条', 2, '01-1月 -18 03.39.28.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000038', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('FA54155F175E47F5B38F64559C5A04DC', '化油剂', '1C7C481A4ABA48BC80F265E79CB670F1', '中石化新兴油库', null, '90027', '5A7C2E23248249BE955A68A3734563BF', null, null, null, '桶', 20, '01-1月 -17 03.44.24.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000039', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('162EE7E793154C089F352920157A1353', '自给开路式压缩空气呼吸器', 'EA3E05C69CAD493BAE19F9B90729A1B2', '王齐俊', null, '90027', 'C5053708E1074B35BC09B559A7EE3FB0', null, null, 'DRAGER-100', '只', 6, '08-5月 -16 08.24.21.000000 上午', '草舍、台南', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000021', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('2E4D9C7324A0427189EF229660CC33DA', '可燃气体报警仪', 'EA3E05C69CAD493BAE19F9B90729A1B2', '王齐俊', null, '90027', 'C5053708E1074B35BC09B559A7EE3FB0', null, null, 'ES2000T', '只', 4, '09-9月 -15 12.00.06.000000 上午', '草舍、台南码头', '固定式报警仪', 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000022', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('95906975E4E347DEA9DB4677C1CB6384', '便携式多功能可燃气体报警仪', 'EA3E05C69CAD493BAE19F9B90729A1B2', '王齐俊', null, '90027', 'C5053708E1074B35BC09B559A7EE3FB0', null, null, 'MC-OWOO-Y-CN', '只', 4, '09-9月 -15 12.00.41.000000 上午', '草舍、台南', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000023', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('1BA2E9A2780C49AF8363BDFEA83A39CF', '洗眼器', '72E955818C2C4BCCB98770D3EFD2E891', '江苏金羚纸业有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', null, null, null, '只', 1, null, '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000089', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('6CB4429BFD0F4407A1F1ADECAB2C7C8F', '沙桶', '72E955818C2C4BCCB98770D3EFD2E891', '江苏金羚纸业有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', '4505', null, null, '桶', 2, null, '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000090', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('B474D2E17087413AA842CA7B7ECF208C', '收集池', '72E955818C2C4BCCB98770D3EFD2E891', '江苏金羚纸业有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', '4505', null, null, '个', 1, null, '码头 ', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000091', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('7C28527B25A44EC7A31D5BF8E69F16B2', '警示标识', '72E955818C2C4BCCB98770D3EFD2E891', '江苏金羚纸业有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', '4503', null, null, '只', 3, null, '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000092', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('79F83FB693F5464C8CB97964D5CC1FA5', '系桩', '72E955818C2C4BCCB98770D3EFD2E891', '江苏金羚纸业有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', '4501', null, null, '只', 2, null, '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000093', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('E780AD67B0CE4274AB9A22DAFB168E2E', '收集池', '72B35C449AF645DF9C46581B4A06FF03', '江苏丰山集团有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', null, null, null, '个', 3, null, '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000081', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('CA2F27F806F24A7DA5ACECE7B7EE4745', '洗眼器', '72B35C449AF645DF9C46581B4A06FF03', '江苏丰山集团有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', null, null, null, '台', 1, null, '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000082', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('8B83D417204041469191408C48547EF3', '系船柱', '72B35C449AF645DF9C46581B4A06FF03', '江苏丰山集团有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', null, null, null, '根', 4, null, '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000083', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('9ECD408E1D424D4CB7EDDD774811ECFF', '应急药品柜', '72B35C449AF645DF9C46581B4A06FF03', '江苏丰山集团有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', null, null, null, '只', 1, null, '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000084', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('E46AF15F16BE42AC973F53E968C81773', '消防栓', '72B35C449AF645DF9C46581B4A06FF03', '江苏丰山集团有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', null, null, null, '只', 1, null, '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000085', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('29F029614B704CBBAF6FC36BA8687A35', '摄像头', '72B35C449AF645DF9C46581B4A06FF03', '江苏丰山集团有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', null, null, null, '只', 4, null, '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000086', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('CA222E532E414D24B6B5A973C05D76C5', '干粉灭火器', '72B35C449AF645DF9C46581B4A06FF03', '江苏丰山集团有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', null, null, null, '台', 2, null, '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000087', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('4D036771C10A4C41B2A046DA9526151A', '尾气吸收装置', '72B35C449AF645DF9C46581B4A06FF03', '江苏丰山集团有限公司', null, '90027', 'A158ADEE0F4A4BC9B71F699ABE8BB86B', null, null, null, '套', 1, null, '码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '2A13C4A53FEC4159BBA7800370FD09A6', '16000000088', 'N', 'N', null, null, null, null);
