 delete from GK_BASIC_JSJY_JYR_CG;

--储罐
insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('A2E1B1ED2F6E4A4F888C0A3EE9A3899D', '1C7C481A4ABA48BC80F265E79CB670F1', '（苏盐）港经证（0013）号（内河）—M002', '收仓罐-2', '3401', null, null, '3501', null, null, '收仓罐区', '北码头东侧', null, 15, 1, '收仓罐1', '1', null, null, '601', 0.005, '901', '3701', '3801', null, null, null, null, null, null, null, '4001', '4101', '202', null, '中石化新兴油库', null, '06-1月 -15 01.53.27.000000 下午', null, null, null, null, null, null, -1, '柴油', null, 0.005, 'aq', 1, '90027', '5A7C2E23248249BE955A68A3734563BF', null, null, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000001', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);

insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('91A0A62DDBDC49B78716E15EC1AF1C51', '1C7C481A4ABA48BC80F265E79CB670F1', '（苏盐）港经证（0013）号（内河）-M001', '收仓罐-1', '3401', null, null, null, null, null, '收仓罐区', '北码头东侧', null, 15, 1, '收仓罐2号', '2', null, null, '601', 0.0005, '901', '3701', '3801', null, null, null, null, null, null, null, '4001', '4101', '201', null, '中石化新兴油库', null, '21-1月 -15 04.46.36.000000 下午', null, null, null, null, null, null, -1, '汽油', null, 0.005, 'aq', 1, '90027', '5A7C2E23248249BE955A68A3734563BF', null, null, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000030', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);

insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('CD95A4B138064262A3603DE111B3E495', 'ABA5E64850F34E4296AD3E78C2D45170', null, 'TE101', '3401', null, null, '3501', '000', '000', null, null, null, null, 1, 'TE101', 'TE101', '501', null, '601', 0.2, '901', '3701', null, '802', null, null, null, null, null, null, '4001', '4101', '201', null, '中石油特庸油库', null, '15-1月 -15 12.00.00.000000 上午', null, null, null, null, null, null, -1, '乙醇', null, 0.2, 'aq', 1, '90027', '909A1A26EC634F76B41CEC45F30F5488', 1, 0.2, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000021', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);

insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('B08FF31716CD4C60B4E727D1266F2556', 'ABA5E64850F34E4296AD3E78C2D45170', null, 'TG101', '3401', null, null, '3501', '000', '000', null, null, null, null, 1, 'TG101', 'TG101', '501', null, null, 0.2, '901', '3701', '3801', '802', null, null, null, null, null, null, '4001', '4101', '201', null, '中石油特庸油库', null, '15-1月 -15 02.30.54.000000 下午', null, null, null, null, null, null, -1, '97#汽油', null, 0.2, 'aq', 1, '90027', '909A1A26EC634F76B41CEC45F30F5488', 1, 0.2, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000022', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);

insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('5B8446A4218E4033BB4FDA46DBE2D083', 'ABA5E64850F34E4296AD3E78C2D45170', null, 'TG102', '3401', null, null, '3501', '000', '000', null, null, null, null, 1, 'TG102', 'TG102', null, null, null, 0.3, '901', '3701', '3801', '802', null, null, null, null, null, null, '4001', '4101', '201', null, '中石油特庸油库', null, '15-1月 -15 02.33.37.000000 下午', null, null, null, null, null, null, -1, '93#组分汽油', null, 0.3, 'aq', 1, '90027', '909A1A26EC634F76B41CEC45F30F5488', 1, 0.3, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000023', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);

insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('7D287E7B9E324B7FA28E419CCBB38257', 'ABA5E64850F34E4296AD3E78C2D45170', null, 'TG103', '3401', null, null, '3501', '000', '000', null, null, null, null, 1, 'TG103', 'TG103', null, null, null, 0.3, '901', '3701', '3801', null, null, null, null, null, null, null, '4001', '4101', '201', null, '中石油特庸油库', null, '15-1月 -15 02.35.40.000000 下午', null, null, null, null, null, null, -1, '93#组分汽油', null, 0.3, 'aq', 1, '90027', '909A1A26EC634F76B41CEC45F30F5488', 1, 0.3, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000024', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);

insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('6D9847394CA940E0BB5166CD1634D7B1', 'ABA5E64850F34E4296AD3E78C2D45170', null, 'TG104', '3401', null, null, '3501', '000', '000', null, null, null, null, 1, 'TG104', 'TG104', null, null, null, 0.5, '901', '3701', '3801', '802', null, null, null, null, null, null, '4001', '4101', '201', null, '中石油特庸油库', null, '15-1月 -15 02.38.06.000000 下午', null, null, null, null, null, null, -1, '93#组分汽油', null, 0.5, 'aq', 1, '90027', '909A1A26EC634F76B41CEC45F30F5488', 1, 0.5, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000025', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);

insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('E887441A9419413DB547FC30A6F549AE', 'ABA5E64850F34E4296AD3E78C2D45170', null, 'TD101', null, null, null, '3501', '000', '000', null, null, null, null, 1, 'TD101', 'TD101', null, null, null, 0.5, '901', '3701', '3801', '802', null, null, null, null, null, null, '4001', '4101', '201', null, '中石油特庸油库', null, '15-1月 -15 02.54.56.000000 下午', null, null, null, null, null, null, -1, '柴油', null, 0.5, 'aq', 1, '90027', '909A1A26EC634F76B41CEC45F30F5488', 1, 0.5, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000026', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);

insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('ACA4F890DB494D949DB008D0C1157786', 'ABA5E64850F34E4296AD3E78C2D45170', null, 'TD102', null, null, null, '3501', '000', '000', null, null, null, null, 1, 'TD102', 'TD102', '501', null, null, 0.5, '901', '3701', '3801', '802', null, null, null, null, null, null, '4001', '4101', '201', null, '中石油特庸油库', null, '15-1月 -15 02.55.50.000000 下午', null, null, null, null, null, null, -1, '柴油', null, 0.5, 'aq', 1, '90027', '909A1A26EC634F76B41CEC45F30F5488', 1, 0.5, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000027', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);

insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('ECFE5F2CCC284545A264672048B55E1A', 'ABA5E64850F34E4296AD3E78C2D45170', null, 'TD103', '3401', null, null, '3501', '000', '000', null, null, null, null, 1, 'TD103', 'TD103', null, null, null, 0.5, '901', '3701', '3801', '802', null, null, null, null, null, null, '4001', '4101', '201', null, '中石油特庸油库', null, '15-1月 -15 02.57.45.000000 下午', null, null, null, null, null, null, -1, '柴油', null, 0.5, 'aq', 1, '90027', '909A1A26EC634F76B41CEC45F30F5488', 1, 0.5, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000028', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);

insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('3112B6A6887E4F999285D9F63C7393E2', 'ABA5E64850F34E4296AD3E78C2D45170', null, 'TD104', '3401', null, null, '3501', '000', '000', null, null, null, null, 1, 'TD104', 'TD104', null, null, null, 0.5, '901', '3701', '3801', '802', null, null, null, null, null, null, '4001', '4101', '201', null, '中石油特庸油库', null, '15-1月 -15 03.12.20.000000 下午', null, null, null, null, null, null, -1, '柴油', null, 0.5, 'aq', 1, '90027', '909A1A26EC634F76B41CEC45F30F5488', 1, 0.5, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000029', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);

insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('ABA78B0E560A4D0484BE1181195B1365', 'DC56003B63624EACB583C26A3EDD586E', '（苏滨）港经证（0012）号C-001', 'V1201a', null, null, null, null, null, null, null, null, null, null, 1, '烧碱储罐', '1#', null, null, '602', 0.2, '901', null, '3801', null, null, null, '32', '40', '15-4月 -11 02.37.50.000000 下午', null, '4001', '4101', '202', null, '盐海化工有限公司', null, '27-1月 -15 02.37.50.000000 下午', null, null, null, null, null, null, -1, '氢氧化钠', null, null, 'aq', 1, '90027', '689EFE7E08284F39896876624262EE0F', null, null, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000041', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);

insert into GK_BASIC_JSJY_JYR_CG (ID, SSJYR, WHZYFZBH, QYCCBH, SCJYHDLX, CCHXPPZSL, ZXGYJZYSB, CCCSCQ, GKZDWXYBH, GKZDWXYBABH, CGQMC, JTWZ, CGZB, CGQMJ, CGGS, CGMC, CGXH, YWFHD, GJZXJL, CGCZ, CGRJ, CGXS, CGAZXS, WZZT, CGWX, SJYL, SJGZYL, SJWD, SJGZWD, TCSJ, SJSYNX, JLFS, CLFS, FJDSSSFNJJZS, ZSBH, TBR, LXDH, TBSJ, HYSL, HYSM, BDZZSL, BDZZSM, QTSL, QTSM, MAPID, HXPMC, HXPPZ, HXPSL, UPDATE_USER, RECORD_STATUS, SZD, SZGQ, ZDWXYCGGS, ZDWXYCGRL, AQGD, ZJ, WXYDJ, CREATE_DATE_TIME, UPDATE_DATE_TIME, CREATE_USER, SZGK, SSGKGLBM, AQID, SFTB, TBZT, SFWXPCG, YGRJ, YGRL, YTCRJ, YTHGCGRJ, LSTCRJ, SNTCRJ, QTSCYCKRJ, YCGID, XKZID, CGLX, BZ)
values ('EDD2BCB6DC904D82B426FDB220529BD9', 'DC56003B63624EACB583C26A3EDD586E', '（苏滨）港经证（0012）号C-001', 'V1201b', null, null, null, null, null, null, null, null, null, null, 1, '烧碱储罐', '2#', null, null, '602', 0.2, '901', null, '3801', null, null, null, '0', null, '15-4月 -11 02.43.11.000000 下午', null, '4001', '4101', '202', null, '盐海化工有限公司', null, '27-1月 -15 02.43.11.000000 下午', null, null, null, null, null, null, -1, '氢氧化钠', null, null, 'aq', 1, '90027', '689EFE7E08284F39896876624262EE0F', null, null, null, null, null, '26-11月-15 08.38.03.704000 下午', '26-11月-15 08.38.03.704000 下午', 'aq', '2A13C4A53FEC4159BBA7800370FD09A6', null, '16000000042', 'N', 'N', null, null, null, null, null, null, null, null, null, null, null, null);
