delete from GK_BASIC_JSJY_JYR_SSSB;
--设施设备
insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('C4400BB4B6DE4CC1A991C06BEC5FCDD4', '灭火器', '408BA22E2ABC417782614039B5AF222C', '长润石油有限公司', null, '90021', '5F20BED79AA041C89B3018C27BEBE549', null, null, null, '只', 5, '31-12月-15 08.38.47.000000 上午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000001', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('379FC419A93F479192168209E905E162', '可燃气体检测仪', 'B5DFD009155247DDA893601A107F0CF8', '常州市九洲石油化工', '15295172848', '90021', 'AAB14468DCFD4C9F8C59DE4EC4999847', '4505', null, null, '套', 4, '31-12月-17 09.26.11.000000 上午', '罐区、码头泵房、发油区', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000021', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('D3E9763A362F45A8894BDF1A1611EFE5', '储油罐液位报警器', 'B5DFD009155247DDA893601A107F0CF8', '常州市九洲石油化工', '15295172848', '90021', 'AAB14468DCFD4C9F8C59DE4EC4999847', '4505', null, null, '套', 12, '31-12月-17 09.39.15.000000 上午', '储罐区', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000022', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('40CB1F2F65224E21B3BEEE950A7E2FEB', '消防泵', 'B5DFD009155247DDA893601A107F0CF8', '常州市九洲石油化工', null, '90021', 'AAB14468DCFD4C9F8C59DE4EC4999847', '4502', null, null, '台', 3, '31-12月-17 09.43.39.000000 上午', '消防泵房', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000023', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('8B06BC109ADC42758CFB3D70175661EC', '泡沫储罐', 'B5DFD009155247DDA893601A107F0CF8', '常州市九洲石油化工', null, '90021', 'AAB14468DCFD4C9F8C59DE4EC4999847', '4502', null, null, '吨', 3, '26-7月 -17 09.46.18.000000 上午', '消防泵房', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000024', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('265F8C3E95874EFCB429A9C11C13643D', '消防栓', 'B5DFD009155247DDA893601A107F0CF8', '常州市九洲石油化工', null, '90021', 'AAB14468DCFD4C9F8C59DE4EC4999847', '4502', null, null, '只', 32, '31-12月-17 09.48.37.000000 上午', '码头、库区', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000025', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('72642DB45E334B9B9FDB7DBBCE11CD34', '泡沫及二氧化碳灭火器', 'B5DFD009155247DDA893601A107F0CF8', '常州市九洲石油化工', null, '90021', 'AAB14468DCFD4C9F8C59DE4EC4999847', '4502', null, null, '台', 36, '31-12月-15 09.50.24.000000 上午', '码头及库区', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000026', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('B997B6F7D35B4AF28D6B0148A548E50A', '灭火器', '35E8AB0C4ED24930B9ADAFF2BFCFA1D1', '武进港务德胜', null, '90021', '1335AB2F688B4C9D925D8F4BE56A5F71', '4502', null, 'MFZ/ABC4型', '只', 53, '30-11月-15 01.05.19.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, 'E8FFA9E619AA4A1BB560876281FBC27C', '10000000027', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('6D2DBA7498E64E378D29F04809117A09', '码头皮靠', '35E8AB0C4ED24930B9ADAFF2BFCFA1D1', '武进港务德胜', null, '90021', '1335AB2F688B4C9D925D8F4BE56A5F71', null, null, null, '只', 40, '30-11月-18 01.18.28.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, 'E8FFA9E619AA4A1BB560876281FBC27C', '10000000028', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('AB8A26035E254200A4C7AC1F7F19267B', '消防栓', '35E8AB0C4ED24930B9ADAFF2BFCFA1D1', '武进港务德胜', null, '90021', '1335AB2F688B4C9D925D8F4BE56A5F71', '4502', null, null, '只', 12, '30-11月-18 01.22.14.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, 'E8FFA9E619AA4A1BB560876281FBC27C', '10000000029', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('B32645A7086149FE99D35A6E41A1E20F', '安全警示牌、标语', '35E8AB0C4ED24930B9ADAFF2BFCFA1D1', '武进港务德胜', null, '90021', '1335AB2F688B4C9D925D8F4BE56A5F71', '4503', null, null, '块', 42, '30-11月-18 01.24.31.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, 'E8FFA9E619AA4A1BB560876281FBC27C', '10000000030', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('E8735F6231474C68A948981B7EFBEFF7', '消防泡、消防栓', '3F151425A7A6494193E816838B5CAAB3', '钟英敏', '13506122380', '90021', 'AAB14468DCFD4C9F8C59DE4EC4999847', '4505', null, '立式地面消防炮、消防栓', '座', 4, '06-11月-21 02.47.49.000000 下午', '码头作业现场东西泊位', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000002', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('9A6D5C8D33BF41238F35863546430EC3', '防爆照明灯具', '606B560BB49E403AAFB1C94C5EEF86DD', '常州新润石化仓储', null, '90021', 'F0892382DD4344C2ACCD520AA89F6586', '4505', null, null, '只', 80, '22-12月-24 10.57.42.000000 上午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, 'E8FFA9E619AA4A1BB560876281FBC27C', '10000000061', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('221E501F1E0D412BBD757073F648C476', '防爆监控', '606B560BB49E403AAFB1C94C5EEF86DD', '常州新润石化仓储', null, '90021', 'F0892382DD4344C2ACCD520AA89F6586', '4505', null, null, '只', 26, '22-12月-14 11.12.33.000000 上午', null, '没有有效期', 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, 'E8FFA9E619AA4A1BB560876281FBC27C', '10000000062', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('05D6B302F0B34C25BA0E941E418893A6', '可燃、有毒气体自动检测报警仪', '606B560BB49E403AAFB1C94C5EEF86DD', '常州新润石化仓储', null, '90021', 'F0892382DD4344C2ACCD520AA89F6586', '4501', null, null, '台', 67, '01-12月-15 03.30.06.000000 下午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, 'E8FFA9E619AA4A1BB560876281FBC27C', '10000000041', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('EA63D6CA7F064110859BAE01A7CC43A9', '防爆扩音对讲', '606B560BB49E403AAFB1C94C5EEF86DD', '常州新润石化仓储', null, '90021', 'F0892382DD4344C2ACCD520AA89F6586', '4501', null, null, '台', 9, '02-12月-17 04.19.54.000000 下午', '值班室', '永久有效（损坏除外）', 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, 'E8FFA9E619AA4A1BB560876281FBC27C', '10000000042', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('05B716C200BF4EB0A5B1B06D292E56C5', '消防泡沫炮', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', '4502', null, null, '门', 2, null, '油库收油码头', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000083', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('8DC329450FA44B51B1B9E262EC11189E', '消防清水泵', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', '4502', null, 'XBD7.3/6 0-W-150-4601', '台', 2, null, '消防泵房', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000084', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('ED53AFA0038D45E2BAFDAF4E81F7E38B', '泡沫消火栓', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', '4502', null, null, '个', 16, null, '油库要害部位', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000085', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('AA95ED921A684E93A98A70AE8600EF01', '清水消火栓', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', '4502', null, null, '个', 16, null, '库区要害部位', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000086', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('75C5F99E662B452987F169F62375683E', '防雷防静电接地', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', '4501', null, '130906', '只', 12, null, null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000091', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('76D8BA8C41484CBEA971E2887C0C77B7', '消防系统', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', '4502', null, null, '套', 1, null, '库区码头 罐区，发货场等要害部位', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000081', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('4789D90492D940A8B6B0A8A196B8AD0D', '消防泡沫泵', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', '4502', null, 'XB8.6/3 5-W-125-270', '台', 1, null, '消防泵房', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000082', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('A884D4B3FDFA4D9E932EEF8E151D13F9', '35KG干粉灭火器', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', '4502', null, null, '只', 10, null, null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000087', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('3EA239287D8E4632BE71F8645912C425', '8KG干粉灭火器', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', null, null, null, '只', 31, '02-10月-17 12.00.00.000000 上午', null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000088', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('0F42D321F5D64BA9B5B55C55FCC2FE6C', '消防水带', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', null, null, null, '盘', 12, null, '库区重点部位', null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000089', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('EBFBD298C2464ADF8ADC58DB50CBD165', '消防水枪', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', '4502', null, null, '个', 10, null, null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000090', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('CDB30F5CBC9F4BDAA971F7AFDBF53AA4', '可燃气体探测仪', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', null, null, null, '只', 6, null, null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000092', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('31F91F844291429F9EB5B0EDFF43108E', '消防泡沫储罐', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', null, null, null, '只', 1, null, null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000093', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('937A2946473D4DC68D7C22039CEE2990', '消油剂', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', null, null, null, 'KG', 300, null, null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000094', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('648885633B584C8BAE5522004986FA94', '围油栏', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', null, null, 'XTL-Y220', '米', 100, null, null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000095', 'N', 'N', null, null, null, null);

insert into GK_BASIC_JSJY_JYR_SSSB (ID, SSMC, SSJYR, TBR, LXDH, SZD, SZGQ, YJFL, EJFL, GGXH, SLDW, SL, YXQ, CFCS, BZ, CREATE_USER, UPDATE_USER, CREATE_DATE_TIME, UPDATE_DATE_TIME, RECORD_STATUS, SSGKGLBM, SZGK, AQID, SFTB, TBZT, BH, YSSSBID, XKZID, SZZYQ)
values ('4AF1204E49EA48FAA0F5C117FFB0E4CC', '吸油毯', '62584E56BB7443CAB2F9DC0938085D61', '常州石油后袁油库', null, '90021', 'E69E85E6D10445A7B52BCC30E4970ED4', null, null, 'PP-2', 'KG', 130, null, null, null, 'aq', 'aq', '27-11月-15 04.10.05.866000 下午', '27-11月-15 04.10.05.866000 下午', 1, null, '6806736F9463483B97DEAAD549A8DAC4', '10000000096', 'N', 'N', null, null, null, null);
